-0.8-0.7-0.6-0.5-0.4-0.3-0.2-0.1 0.0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8

-0.8 -0.6 -0.4 -0.2 0.0 +0.2 +0.4 +0.6 +0.8

% dVs/Vs

SIO: SB4L18 equatorial

08/15/02 13:18:01